From abe61b7517f07dfdb710a2ceb94676819f77a8d8 Mon Sep 17 00:00:00 2001
From: Eric Bailey <git@esb.lol>
Date: Thu, 30 Nov 2023 17:48:07 -0600
Subject: Disable OTA for now (#2052)

---
 src/view/shell/index.tsx | 2 --
 1 file changed, 2 deletions(-)

(limited to 'src/view/shell/index.tsx')

diff --git a/src/view/shell/index.tsx b/src/view/shell/index.tsx
index 71d65a755..5562af9ac 100644
--- a/src/view/shell/index.tsx
+++ b/src/view/shell/index.tsx
@@ -23,7 +23,6 @@ import {
   SafeAreaProvider,
   initialWindowMetrics,
 } from 'react-native-safe-area-context'
-import {useOTAUpdate} from 'lib/hooks/useOTAUpdate'
 import {
   useIsDrawerOpen,
   useSetDrawerOpen,
@@ -37,7 +36,6 @@ function ShellInner() {
   const isDrawerOpen = useIsDrawerOpen()
   const isDrawerSwipeDisabled = useIsDrawerSwipeDisabled()
   const setIsDrawerOpen = useSetDrawerOpen()
-  useOTAUpdate() // this hook polls for OTA updates every few seconds
   const winDim = useWindowDimensions()
   const safeAreaInsets = useSafeAreaInsets()
   const containerPadding = React.useMemo(
-- 
cgit 1.4.1

