From 196dd3a8abdc4ebdd0a73c5f6afe2acca38d8efc Mon Sep 17 00:00:00 2001
From: Mary <148872143+mary-ext@users.noreply.github.com>
Date: Sun, 14 Apr 2024 02:02:22 +0700
Subject: Increase hit slop for web's app language picker (#3535)

* fix: make app language picker tap region larger

* fix: add right padding on drawer signup card

noticeable on portuguese language

* fix: mimic hitSlop
---
 src/view/shell/Drawer.tsx | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'src/view/shell/Drawer.tsx')

diff --git a/src/view/shell/Drawer.tsx b/src/view/shell/Drawer.tsx
index a7342179d..3972797b7 100644
--- a/src/view/shell/Drawer.tsx
+++ b/src/view/shell/Drawer.tsx
@@ -224,7 +224,9 @@ let DrawerContent = ({}: {}): React.ReactNode => {
               />
             </View>
           ) : (
-            <NavSignupCard />
+            <View style={{paddingRight: 20}}>
+              <NavSignupCard />
+            </View>
           )}
 
           {hasSession ? (
-- 
cgit 1.4.1

