From 3fbac466ac8554fcb690fccbe0053a5be07801d7 Mon Sep 17 00:00:00 2001
From: Cooper Edmunds <cooper6789@gmail.com>
Date: Wed, 29 Nov 2023 19:28:35 -0500
Subject: Update home-screen tests related to feeds

---
 src/view/screens/Profile.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/view/screens/Profile.tsx')

diff --git a/src/view/screens/Profile.tsx b/src/view/screens/Profile.tsx
index 7ddcf17af..35efe3a0c 100644
--- a/src/view/screens/Profile.tsx
+++ b/src/view/screens/Profile.tsx
@@ -267,6 +267,7 @@ function ProfileScreenLoaded({
       screenDescription="profile"
       moderation={moderation.account}>
       <PagerWithHeader
+        testID="profilePager"
         isHeaderReady={true}
         items={sectionTitles}
         onPageSelected={onPageSelected}
-- 
cgit 1.4.1

