From f8b43e1f7ed792968740b5c77de140538ab97dbb Mon Sep 17 00:00:00 2001
From: Pranith Kanchan <121748427+Pranith-Kanchan@users.noreply.github.com>
Date: Mon, 5 Feb 2024 17:40:19 +0530
Subject: link in Moderation screen cannot be tapped #2745

link in Moderation screen cannot be tapped #2745
---
 src/view/screens/Moderation.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/view/screens/Moderation.tsx')

diff --git a/src/view/screens/Moderation.tsx b/src/view/screens/Moderation.tsx
index 96bb46cef..98e447c6f 100644
--- a/src/view/screens/Moderation.tsx
+++ b/src/view/screens/Moderation.tsx
@@ -220,6 +220,7 @@ function PwiOptOut() {
           paddingLeft: 66,
           paddingRight: 12,
           paddingBottom: 10,
+          marginBottom: 64
         }}>
         <Text style={pal.textLight}>
           <Trans>
-- 
cgit 1.4.1

