From 57ac782a2c6e68cc94a2427269199071d8fbdc7b Mon Sep 17 00:00:00 2001
From: Minseo Lee <itoupluk427@gmail.com>
Date: Tue, 23 Jan 2024 10:12:43 +0900
Subject: Set left margin of new list buttons

---
 src/view/screens/Lists.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/view/screens/Lists.tsx')

diff --git a/src/view/screens/Lists.tsx b/src/view/screens/Lists.tsx
index 23d6c8fac..bdd5dd9b7 100644
--- a/src/view/screens/Lists.tsx
+++ b/src/view/screens/Lists.tsx
@@ -61,7 +61,7 @@ export function ListsScreen({}: Props) {
             <Trans>Public, shareable lists which can drive feeds.</Trans>
           </Text>
         </View>
-        <View>
+        <View style={[{marginLeft: 18}, isMobile && {marginLeft: 12}]}>
           <Button
             testID="newUserListBtn"
             type="default"
-- 
cgit 1.4.1

