From a9765fd23f59d31d60f5aaedd95e751f65adc969 Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Thu, 26 Sep 2024 14:09:02 +0100
Subject: Fix banner height in edit profile modal (#5494)

* fix banner height

* fix user banner, it's not edit profile's fault
---
 src/view/com/util/UserBanner.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/view/com/util/UserBanner.tsx')

diff --git a/src/view/com/util/UserBanner.tsx b/src/view/com/util/UserBanner.tsx
index 0e07a5745..13f4081fc 100644
--- a/src/view/com/util/UserBanner.tsx
+++ b/src/view/com/util/UserBanner.tsx
@@ -202,7 +202,7 @@ const styles = StyleSheet.create({
   },
   bannerImage: {
     width: '100%',
-    height: '100%',
+    height: 150,
   },
   defaultBanner: {
     backgroundColor: '#0070ff',
-- 
cgit 1.4.1

