From 1512b5cf68e9e92801a894392569b444fd6af1d1 Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Tue, 12 Mar 2024 22:02:28 +0000
Subject: run linter

---
 src/view/com/util/MainScrollProvider.tsx | 11 ++++++-----
 1 file changed, 6 insertions(+), 5 deletions(-)

(limited to 'src/view/com/util/MainScrollProvider.tsx')

diff --git a/src/view/com/util/MainScrollProvider.tsx b/src/view/com/util/MainScrollProvider.tsx
index 01b8a954d..1ed0631ac 100644
--- a/src/view/com/util/MainScrollProvider.tsx
+++ b/src/view/com/util/MainScrollProvider.tsx
@@ -1,11 +1,12 @@
-import React, {useCallback, useEffect} from 'react'
 import EventEmitter from 'eventemitter3'
-import {ScrollProvider} from '#/lib/ScrollContext'
+import {isNative, isWeb} from 'platform/detection'
+import React, {useCallback, useEffect} from 'react'
 import {NativeScrollEvent} from 'react-native'
-import {useSetMinimalShellMode, useMinimalShellMode} from '#/state/shell'
+import {interpolate, useSharedValue} from 'react-native-reanimated'
+
+import {ScrollProvider} from '#/lib/ScrollContext'
+import {useMinimalShellMode, useSetMinimalShellMode} from '#/state/shell'
 import {useShellLayout} from '#/state/shell/shell-layout'
-import {isNative, isWeb} from 'platform/detection'
-import {useSharedValue, interpolate} from 'react-native-reanimated'
 
 const WEB_HIDE_SHELL_THRESHOLD = 200
 
-- 
cgit 1.4.1

