From 125ef1c75610c7add79f6a917bfa058f9265d5d4 Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Wed, 13 Mar 2024 01:55:14 +0000
Subject: Revert "run linter"

This reverts commit 1512b5cf68e9e92801a894392569b444fd6af1d1.
---
 src/view/com/util/MainScrollProvider.tsx | 11 +++++------
 1 file changed, 5 insertions(+), 6 deletions(-)

(limited to 'src/view/com/util/MainScrollProvider.tsx')

diff --git a/src/view/com/util/MainScrollProvider.tsx b/src/view/com/util/MainScrollProvider.tsx
index 1ed0631ac..01b8a954d 100644
--- a/src/view/com/util/MainScrollProvider.tsx
+++ b/src/view/com/util/MainScrollProvider.tsx
@@ -1,12 +1,11 @@
-import EventEmitter from 'eventemitter3'
-import {isNative, isWeb} from 'platform/detection'
 import React, {useCallback, useEffect} from 'react'
-import {NativeScrollEvent} from 'react-native'
-import {interpolate, useSharedValue} from 'react-native-reanimated'
-
+import EventEmitter from 'eventemitter3'
 import {ScrollProvider} from '#/lib/ScrollContext'
-import {useMinimalShellMode, useSetMinimalShellMode} from '#/state/shell'
+import {NativeScrollEvent} from 'react-native'
+import {useSetMinimalShellMode, useMinimalShellMode} from '#/state/shell'
 import {useShellLayout} from '#/state/shell/shell-layout'
+import {isNative, isWeb} from 'platform/detection'
+import {useSharedValue, interpolate} from 'react-native-reanimated'
 
 const WEB_HIDE_SHELL_THRESHOLD = 200
 
-- 
cgit 1.4.1

