From 0ee20731d42bd58ac6a1020615e399b01767ce2d Mon Sep 17 00:00:00 2001
From: Foster <ckhofq@gmail.com>
Date: Wed, 4 Dec 2024 16:42:15 -0500
Subject: adjust feed scroll bar top offset (#6940)

Co-authored-by: skipness <ckhf@proton.me>
---
 src/view/com/util/List.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/view/com/util/List.tsx')

diff --git a/src/view/com/util/List.tsx b/src/view/com/util/List.tsx
index 8176d0b43..31fd0aa1d 100644
--- a/src/view/com/util/List.tsx
+++ b/src/view/com/util/List.tsx
@@ -151,7 +151,7 @@ let List = React.forwardRef<ListMethods, ListProps>(
     return (
       <FlatList_INTERNAL
         {...props}
-        scrollIndicatorInsets={{right: 1}}
+        scrollIndicatorInsets={{top: headerOffset, right: 1}}
         contentOffset={contentOffset}
         refreshControl={refreshControl}
         onScroll={scrollHandler}
-- 
cgit 1.4.1

