From 36dc1c752556b8413dfb4d8fae6f930888489224 Mon Sep 17 00:00:00 2001
From: Paul Frazee <pfrazee@gmail.com>
Date: Sun, 18 Dec 2022 16:43:18 -0600
Subject: Reduce confusing visual feedback while scrolling

---
 src/view/com/post-thread/PostThreadItem.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/view/com/post-thread/PostThreadItem.tsx')

diff --git a/src/view/com/post-thread/PostThreadItem.tsx b/src/view/com/post-thread/PostThreadItem.tsx
index ae13e0765..1a0c744d6 100644
--- a/src/view/com/post-thread/PostThreadItem.tsx
+++ b/src/view/com/post-thread/PostThreadItem.tsx
@@ -226,7 +226,7 @@ export const PostThreadItem = observer(function PostThreadItem({
     )
   } else {
     return (
-      <Link style={styles.outer} href={itemHref} title={itemTitle}>
+      <Link style={styles.outer} href={itemHref} title={itemTitle} noFeedback>
         {!item.replyingTo && item.record.reply && (
           <View style={styles.parentReplyLine} />
         )}
-- 
cgit 1.4.1

