From 1de1d10cf6b823f075112f8f938963c95b7fd3ba Mon Sep 17 00:00:00 2001
From: Hailey <me@haileyok.com>
Date: Thu, 8 Feb 2024 12:01:36 -0800
Subject: Fix error screen on native, use `Not Found` for profile errors
 instead of `Oops!` (#2789)

* remove unnecessary `<CenterView>`

* show back header on profile error

* use `Not Found` instead of `Oops` for account errors

* use `Not Found` instead of `Oops` for account errors
---
 src/view/com/modals/ProfilePreview.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/view/com/modals/ProfilePreview.tsx')

diff --git a/src/view/com/modals/ProfilePreview.tsx b/src/view/com/modals/ProfilePreview.tsx
index 88b0df71d..1764b6b90 100644
--- a/src/view/com/modals/ProfilePreview.tsx
+++ b/src/view/com/modals/ProfilePreview.tsx
@@ -46,7 +46,7 @@ export function Component({did}: {did: string}) {
   if (profileError) {
     return (
       <ErrorScreen
-        title={_(msg`Oops!`)}
+        title={_(msg`Not Found`)}
         message={cleanError(profileError)}
         onPressTryAgain={refetchProfile}
       />
-- 
cgit 1.4.1

