From 05e4e4ff93b0e4b7c5515852017be046ebc3859c Mon Sep 17 00:00:00 2001
From: Ansh <anshnanda10@gmail.com>
Date: Wed, 12 Apr 2023 18:28:45 -0700
Subject: add maxHeight of 100vh to web modal to stop overflow (#463)

---
 src/view/com/modals/Modal.web.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/view/com/modals/Modal.web.tsx')

diff --git a/src/view/com/modals/Modal.web.tsx b/src/view/com/modals/Modal.web.tsx
index 6f026e174..25fed69a4 100644
--- a/src/view/com/modals/Modal.web.tsx
+++ b/src/view/com/modals/Modal.web.tsx
@@ -114,6 +114,7 @@ const styles = StyleSheet.create({
   container: {
     width: 500,
     maxWidth: '100vw',
+    maxHeight: '100vh',
     paddingVertical: 20,
     paddingHorizontal: 24,
     borderRadius: 8,
-- 
cgit 1.4.1

