From d6dc52b6eadade991846c61e748d09a6f2b0ef78 Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Fri, 29 Aug 2025 18:15:05 +0300
Subject: Improve e2e tests (#8927)

* get e2e image picker working

* verify create account actually reaches onboarding

* wait for image to actually be attached before posting

* wait until login finishes before moving on

* sign out before switch accounts then wait until logged in

* disable onboarding experiments in e2e

* add testId to handle availability checkmark

* fix too long username

* update thread muting test to reflect current behaviour

* hackfix for the british english translation

* unflake the onboarding tests

* fix curate list flow

* admit defeat on the most list one
---
 src/screens/Signup/StepHandle/index.tsx | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'src/screens/Signup/StepHandle/index.tsx')

diff --git a/src/screens/Signup/StepHandle/index.tsx b/src/screens/Signup/StepHandle/index.tsx
index 5bf6b2269..64333933c 100644
--- a/src/screens/Signup/StepHandle/index.tsx
+++ b/src/screens/Signup/StepHandle/index.tsx
@@ -168,7 +168,10 @@ export function StepHandle() {
               </TextField.GhostText>
             )}
             {isHandleAvailable?.available && (
-              <CheckIcon style={[{color: t.palette.positive_600}, a.z_20]} />
+              <CheckIcon
+                testID="handleAvailableCheck"
+                style={[{color: t.palette.positive_600}, a.z_20]}
+              />
             )}
           </TextField.Root>
         </View>
-- 
cgit 1.4.1

