From b1cc4a5e9fcf48a793dac6e6e941725aaa8b50f7 Mon Sep 17 00:00:00 2001
From: Minseo Lee <itoupluk427@gmail.com>
Date: Wed, 12 Feb 2025 06:07:00 +0900
Subject: Refine accessibilityHint (#7554)

* `accessibilityHint`

* accessibilityHint

* Update

Co-Authored-By: jason-me <mail@jason-hester.me>

* Update LoginForm.tsx

---------

Co-authored-by: jason-me <mail@jason-hester.me>
---
 src/screens/Settings/components/ChangeHandleDialog.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/screens/Settings/components/ChangeHandleDialog.tsx')

diff --git a/src/screens/Settings/components/ChangeHandleDialog.tsx b/src/screens/Settings/components/ChangeHandleDialog.tsx
index 6450e24b2..b69713a10 100644
--- a/src/screens/Settings/components/ChangeHandleDialog.tsx
+++ b/src/screens/Settings/components/ChangeHandleDialog.tsx
@@ -537,7 +537,7 @@ function OwnHandlePage({goToServiceHandle}: {goToServiceHandle: () => void}) {
 
         <Button
           label={_(msg`Use default provider`)}
-          accessibilityHint={_(msg`Go back to previous page`)}
+          accessibilityHint={_(msg`Returns to previous page`)}
           onPress={goToServiceHandle}
           variant="outline"
           color="secondary"
-- 
cgit 1.4.1

