From 9e8bceec60f065bd52ea2e6c24b22ab42553d04d Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Tue, 9 Sep 2025 20:27:16 +0300
Subject: reduce checkmark size in thread anchor (#8942)

---
 src/screens/PostThread/components/ThreadItemAnchor.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/screens/PostThread/components/ThreadItemAnchor.tsx')

diff --git a/src/screens/PostThread/components/ThreadItemAnchor.tsx b/src/screens/PostThread/components/ThreadItemAnchor.tsx
index 0eb7c2e25..51bf41a76 100644
--- a/src/screens/PostThread/components/ThreadItemAnchor.tsx
+++ b/src/screens/PostThread/components/ThreadItemAnchor.tsx
@@ -354,7 +354,7 @@ const ThreadItemAnchorInner = memo(function ThreadItemAnchorInner({
                     )}
                   </Text>
 
-                  <View style={[{paddingLeft: 3, top: -1}]}>
+                  <View style={[a.pl_xs]}>
                     <VerificationCheckButton profile={authorShadow} size="md" />
                   </View>
                 </View>
-- 
cgit 1.4.1

