From a3334a01a221877d3e06e02f960fda441f3460bd Mon Sep 17 00:00:00 2001
From: Paul Frazee <pfrazee@gmail.com>
Date: Fri, 31 Mar 2023 13:17:26 -0500
Subject: Lex refactor (#362)

* Remove the hackcheck for upgrades

* Rename the PostEmbeds folder to match the codebase style

* Updates to latest lex refactor

* Update to use new bsky agent

* Update to use api package's richtext library

* Switch to upsertProfile

* Add TextEncoder/TextDecoder polyfill

* Add Intl.Segmenter polyfill

* Update composer to calculate lengths by grapheme

* Fix detox

* Fix login in e2e

* Create account e2e passing

* Implement an e2e mocking framework

* Don't use private methods on mobx models as mobx can't track them

* Add tooling for e2e-specific builds and add e2e media-picker mock

* Add some tests and fix some bugs around profile editing

* Add shell tests

* Add home screen tests

* Add thread screen tests

* Add tests for other user profile screens

* Add search screen tests

* Implement profile imagery change tools and tests

* Update to new embed behaviors

* Add post tests

* Fix to profile-screen test

* Fix session resumption

* Update web composer to new api

* 1.11.0

* Fix pagination cursor parameters

* Add quote posts to notifications

* Fix embed layouts

* Remove youtube inline player and improve tap handling on link cards

* Reset minimal shell mode on all screen loads and feed swipes (close #299)

* Update podfile.lock

* Improve post notfound UI (close #366)

* Bump atproto packages
---
 src/lib/media/picker.e2e.tsx | 116 +++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 116 insertions(+)
 create mode 100644 src/lib/media/picker.e2e.tsx

(limited to 'src/lib/media/picker.e2e.tsx')

diff --git a/src/lib/media/picker.e2e.tsx b/src/lib/media/picker.e2e.tsx
new file mode 100644
index 000000000..9f4765ac2
--- /dev/null
+++ b/src/lib/media/picker.e2e.tsx
@@ -0,0 +1,116 @@
+import {RootStoreModel} from 'state/index'
+import {PickerOpts, CameraOpts, CropperOpts, PickedMedia} from './types'
+import {
+  scaleDownDimensions,
+  Dim,
+  compressIfNeeded,
+  moveToPremanantPath,
+} from 'lib/media/manip'
+export type {PickedMedia} from './types'
+import RNFS from 'react-native-fs'
+
+let _imageCounter = 0
+async function getFile() {
+  const files = await RNFS.readDir(
+    RNFS.LibraryDirectoryPath.split('/')
+      .slice(0, -5)
+      .concat(['Media', 'DCIM', '100APPLE'])
+      .join('/'),
+  )
+  return files[_imageCounter++ % files.length]
+}
+
+export async function openPicker(
+  _store: RootStoreModel,
+  opts: PickerOpts,
+): Promise<PickedMedia[]> {
+  const mediaType = opts.mediaType || 'photo'
+  const items = await getFile()
+  const toMedia = (item: RNFS.ReadDirItem) => ({
+    mediaType,
+    path: item.path,
+    mime: 'image/jpeg',
+    size: item.size,
+    width: 4288,
+    height: 2848,
+  })
+  if (Array.isArray(items)) {
+    return items.map(toMedia)
+  }
+  return [toMedia(items)]
+}
+
+export async function openCamera(
+  _store: RootStoreModel,
+  opts: CameraOpts,
+): Promise<PickedMedia> {
+  const mediaType = opts.mediaType || 'photo'
+  const item = await getFile()
+  return {
+    mediaType,
+    path: item.path,
+    mime: 'image/jpeg',
+    size: item.size,
+    width: 4288,
+    height: 2848,
+  }
+}
+
+export async function openCropper(
+  _store: RootStoreModel,
+  opts: CropperOpts,
+): Promise<PickedMedia> {
+  const mediaType = opts.mediaType || 'photo'
+  const item = await getFile()
+  return {
+    mediaType,
+    path: item.path,
+    mime: 'image/jpeg',
+    size: item.size,
+    width: 4288,
+    height: 2848,
+  }
+}
+
+export async function pickImagesFlow(
+  store: RootStoreModel,
+  maxFiles: number,
+  maxDim: Dim,
+  maxSize: number,
+) {
+  const items = await openPicker(store, {
+    multiple: true,
+    maxFiles,
+    mediaType: 'photo',
+  })
+  const result = []
+  for (const image of items) {
+    result.push(
+      await cropAndCompressFlow(store, image.path, image, maxDim, maxSize),
+    )
+  }
+  return result
+}
+
+export async function cropAndCompressFlow(
+  store: RootStoreModel,
+  path: string,
+  imgDim: Dim,
+  maxDim: Dim,
+  maxSize: number,
+) {
+  // choose target dimensions based on the original
+  // this causes the photo cropper to start with the full image "selected"
+  const {width, height} = scaleDownDimensions(imgDim, maxDim)
+  const cropperRes = await openCropper(store, {
+    mediaType: 'photo',
+    path,
+    freeStyleCropEnabled: true,
+    width,
+    height,
+  })
+
+  const img = await compressIfNeeded(cropperRes, maxSize)
+  const permanentPath = await moveToPremanantPath(img.path)
+  return permanentPath
+}
-- 
cgit 1.4.1

