From 9e8bceec60f065bd52ea2e6c24b22ab42553d04d Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Tue, 9 Sep 2025 20:27:16 +0300
Subject: reduce checkmark size in thread anchor (#8942)

---
 src/components/verification/VerificationCheckButton.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/verification/VerificationCheckButton.tsx')

diff --git a/src/components/verification/VerificationCheckButton.tsx b/src/components/verification/VerificationCheckButton.tsx
index 2ccc730f6..3f3bb2095 100644
--- a/src/components/verification/VerificationCheckButton.tsx
+++ b/src/components/verification/VerificationCheckButton.tsx
@@ -85,7 +85,7 @@ export function Badge({
   if (size === 'lg') {
     dimensions = gtPhone ? 20 : 18
   } else if (size === 'md') {
-    dimensions = 16
+    dimensions = 14
   }
 
   const verifiedByHidden = !state.profile.showBadge && state.profile.isViewer
-- 
cgit 1.4.1

