From 5be753ecdfaf486c5d01d90c34008a1f5f275f00 Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Wed, 10 Sep 2025 17:44:19 +0300
Subject: add prevent default to thread anchor checkmark (#9020)

---
 src/components/verification/VerificationCheckButton.tsx | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'src/components/verification/VerificationCheckButton.tsx')

diff --git a/src/components/verification/VerificationCheckButton.tsx b/src/components/verification/VerificationCheckButton.tsx
index 3f3bb2095..45449f43c 100644
--- a/src/components/verification/VerificationCheckButton.tsx
+++ b/src/components/verification/VerificationCheckButton.tsx
@@ -99,15 +99,15 @@ export function Badge({
             : _(msg`View this user's verifications`)
         }
         hitSlop={20}
-        onPress={() => {
+        onPress={evt => {
+          evt.preventDefault()
           logger.metric('verification:badge:click', {}, {statsig: true})
           if (state.profile.role === 'verifier') {
             verifierDialogControl.open()
           } else {
             verificationsDialogControl.open()
           }
-        }}
-        style={[]}>
+        }}>
         {({hovered}) => (
           <View
             style={[
-- 
cgit 1.4.1

