From 22e86c99033a55881bf02a3129b653a13bac619e Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Fri, 19 Apr 2024 23:26:04 +0100
Subject: fix onEndReached issue by forcing flatlist to scroll (#3623)

---
 src/components/dialogs/GifSelect.tsx | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'src/components/dialogs/GifSelect.tsx')

diff --git a/src/components/dialogs/GifSelect.tsx b/src/components/dialogs/GifSelect.tsx
index c8897da36..baff31168 100644
--- a/src/components/dialogs/GifSelect.tsx
+++ b/src/components/dialogs/GifSelect.tsx
@@ -147,7 +147,11 @@ function GifList({
         <View
           style={[
             a.absolute,
-            {top: 0, left: 0, right: 0, height: '50%'},
+            a.inset_0,
+            {
+              borderBottomLeftRadius: 8,
+              borderBottomRightRadius: 8,
+            },
             t.atoms.bg,
           ]}
         />
-- 
cgit 1.4.1

