From d84d54bae39642ed995fbc7ef235f1ea1e88c8c0 Mon Sep 17 00:00:00 2001
From: Bartosz Kaszubowski <gosimek@gmail.com>
Date: Thu, 7 Aug 2025 18:23:01 +0200
Subject: Fix web scrollable select unwanted overflow (#8786)

---
 src/components/Select/index.web.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/components/Select/index.web.tsx')

diff --git a/src/components/Select/index.web.tsx b/src/components/Select/index.web.tsx
index a4d3fb80b..cfb401f97 100644
--- a/src/components/Select/index.web.tsx
+++ b/src/components/Select/index.web.tsx
@@ -190,6 +190,7 @@ export function Content<T>({items, renderItem}: ContentProps<T>) {
             a.border,
             t.atoms.border_contrast_low,
             a.rounded_sm,
+            a.overflow_hidden,
           ]}>
           <RadixSelect.ScrollUpButton style={flatten(up)}>
             <ChevronUpIcon style={[t.atoms.text]} size="xs" />
-- 
cgit 1.4.1

