From 3e2c181c404e2070873bc9c473b428a610bd193e Mon Sep 17 00:00:00 2001
From: Samuel Newman <mozzius@protonmail.com>
Date: Tue, 9 Sep 2025 18:09:10 +0300
Subject: Upgrade `@types/react` to 19 and run codemod (attempt 2) (#8918)

* update dependencies

* rm `import type React from 'react'`

* run codemods

* patch discord types

* update types/react-dom

* Update yarn.lock
---
 src/components/ProgressGuide/FollowDialog.tsx | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'src/components/ProgressGuide/FollowDialog.tsx')

diff --git a/src/components/ProgressGuide/FollowDialog.tsx b/src/components/ProgressGuide/FollowDialog.tsx
index f2eb4fa3d..c4a5f0fa0 100644
--- a/src/components/ProgressGuide/FollowDialog.tsx
+++ b/src/components/ProgressGuide/FollowDialog.tsx
@@ -293,8 +293,8 @@ let Header = ({
   interestsDisplayNames,
 }: {
   guide: Follow10ProgressGuide
-  inputRef: React.RefObject<TextInput>
-  listRef: React.RefObject<ListMethods>
+  inputRef: React.RefObject<TextInput | null>
+  listRef: React.RefObject<ListMethods | null>
   onSelectTab: (v: string) => void
   searchText: string
   setHeaderHeight: (v: number) => void
@@ -565,7 +565,7 @@ function SearchInput({
 }: {
   onChangeText: (text: string) => void
   onEscape: () => void
-  inputRef: React.RefObject<TextInput>
+  inputRef: React.RefObject<TextInput | null>
   defaultValue: string
 }) {
   const t = useTheme()
-- 
cgit 1.4.1

