From 2571432875a8a7104f82b87a480e3650c6f32f6c Mon Sep 17 00:00:00 2001
From: Paul Frazee <pfrazee@gmail.com>
Date: Tue, 5 Dec 2023 22:56:20 -0800
Subject: Disable react-native-screen freezing to test performance implications
 (#2109)

---
 src/App.native.tsx | 2 --
 1 file changed, 2 deletions(-)

(limited to 'src/App.native.tsx')

diff --git a/src/App.native.tsx b/src/App.native.tsx
index 8168f39d4..5ffbb6a82 100644
--- a/src/App.native.tsx
+++ b/src/App.native.tsx
@@ -6,7 +6,6 @@ import {RootSiblingParent} from 'react-native-root-siblings'
 import * as SplashScreen from 'expo-splash-screen'
 import {GestureHandlerRootView} from 'react-native-gesture-handler'
 import {QueryClientProvider} from '@tanstack/react-query'
-import {enableFreeze} from 'react-native-screens'
 
 import 'view/icons'
 
@@ -37,7 +36,6 @@ import {
 import {Provider as UnreadNotifsProvider} from 'state/queries/notifications/unread'
 import * as persisted from '#/state/persisted'
 
-enableFreeze(true)
 SplashScreen.preventAutoHideAsync()
 
 function InnerApp() {
-- 
cgit 1.4.1

